From c386a052b8e1cd109ab4888c87cd3073a74edaa2 Mon Sep 17 00:00:00 2001
From: Dominic Symes <dominic.symes@arm.com>
Date: Fri, 20 Jan 2023 16:09:31 +0000
Subject: Main inference conformance draft

This patch contains a draft of the
Main Inference profile floating-point
conformance requirements.

Change-Id: Ib1201fff7f4015668b2de6dccf4cd85b419c3f76
Signed-off-by: Dominic Symes <dominic.symes@arm.com>
---
 tosa_spec.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'tosa_spec.adoc')

diff --git a/tosa_spec.adoc b/tosa_spec.adoc
index 15a74d3..64611f0 100644
--- a/tosa_spec.adoc
+++ b/tosa_spec.adoc
@@ -23,3 +23,5 @@ include::chapters/introduction.adoc[]
 include::chapters/operators.adoc[]
 
 include::chapters/pseudocode.adoc[]
+
+include::chapters/appendix_a.adoc[]
-- 
cgit v1.2.1

