From 0738025d386e0aa0e274ded20afdf000b22a1635 Mon Sep 17 00:00:00 2001
From: Eric Kunze <eric.kunze@arm.com>
Date: Thu, 2 Jun 2022 08:30:18 -0700
Subject: Make the use of inverse in FFT2D definition consistent

The captions for the images used 'direction', instead of 'inverse'
which is the attribute name.

Signed-off-by: Eric Kunze <eric.kunze@arm.com>
Change-Id: I4d8ab9642288efb984d03b7862068e09334ce8f6
---
 chapters/tensor_ops.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'chapters/tensor_ops.adoc')

diff --git a/chapters/tensor_ops.adoc b/chapters/tensor_ops.adoc
index b3f6f5a..bd5ffde 100644
--- a/chapters/tensor_ops.adoc
+++ b/chapters/tensor_ops.adoc
@@ -342,12 +342,12 @@ No normalization is applied on either the forward or inverse versions of the ope
 
 // output[h][w] = \sum_{m=0}^{H-1}\sum_{n=0}^{W-1}input[m][n] * \exp\left(-2\pi i\left(\frac{mh}{H} + \frac{nw}{W}\right)\right)
 
-.Calculation for the forward FFT2D calculation (direction=false)
+.Calculation for the forward FFT2D calculation (inverse=false)
 image::forward_fft2d.svg["forward FFT definition", align="center"]
 
 // output[h][w] = \sum_{m=0}^{H-1}\sum_{n=0}^{W-1}input[m][n] * \exp\left(2\pi i\left(\frac{mh}{H} + \frac{nw}{W}\right)\right)
 
-.Calculation for the inverse FFT2D calculation (direction=true)
+.Calculation for the inverse FFT2D calculation (inverse=true)
 image::inverse_fft2d.svg["inverse FFT definition", align="center"]
 
 *Arguments:*
-- 
cgit v1.2.1

