From 2dce0d022b5103f93bf4393e5cd9a3009fbf5add Mon Sep 17 00:00:00 2001
From: Eric Kunze <eric.kunze@arm.com>
Date: Tue, 12 Jan 2021 16:19:50 -0800
Subject: Remove aint8 type

The aint8 type represented an asymmetrically quantized range.
With the change to move scaling fully into the RESCALE operator,
the aint8 and int8 types didn't have significant differences in
their use with operators. Unifying to a single data type makes
things simpler.

Signed-off-by: Eric Kunze <eric.kunze@arm.com>
Change-Id: I3ee89cbdafdc61293ef1f1bec52398d744e716a1
---
 chapters/scatter_gather.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'chapters/scatter_gather.adoc')

diff --git a/chapters/scatter_gather.adoc b/chapters/scatter_gather.adoc
index 65c0fe3..a026335 100644
--- a/chapters/scatter_gather.adoc
+++ b/chapters/scatter_gather.adoc
@@ -1,7 +1,7 @@
 //
 // This confidential and proprietary software may be used only as
 // authorised by a licensing agreement from ARM Limited
-// (C) COPYRIGHT 2020 ARM Limited
+// (C) COPYRIGHT 2020-2021 ARM Limited
 // ALL RIGHTS RESERVED
 // The entire notice above must be reproduced on all authorised
 // copies and copies may only be made to the extent permitted
@@ -45,7 +45,7 @@ for_each(0<=n<N, 0<=w<W, 0<=c<C) {
 |===
 |Profile|Mode|index_t|value_t
 
-|Any|signed 8|int32|aint8
+|Any|signed 8|int32|int8
 |Any|signed 16|int32|int16
 |Any|signed 32|int32|int32
 |MI,MT|float|int32|float
@@ -106,7 +106,7 @@ for_each(0<=n<N, 0<=w<W, 0<=c<C) {
 |===
 |Profile|Mode|index_t|value_t
 
-|Any|signed 8|int32|aint8
+|Any|signed 8|int32|int8
 |Any|signed 16|int32|int16
 |Any|signed 32|int32|int32
 |MI,MT|float|int32|float
-- 
cgit v1.2.1

