From 2266c7aac5e6e3a3fb1d363526b9a4cd38b64bd3 Mon Sep 17 00:00:00 2001
From: Eric Kunze <eric.kunze@arm.com>
Date: Fri, 27 Oct 2023 14:38:56 -0700
Subject: Accuracy requirements for RESIZE operator

Initial accuracy requirements for RESIZE calculations.

Signed-off-by: Eric Kunze <eric.kunze@arm.com>
Change-Id: I44f997df857915ca77b04dd0b87dee9ccac6e7b0
---
 chapters/introduction.adoc | 8 ++++++++
 1 file changed, 8 insertions(+)

(limited to 'chapters/introduction.adoc')

diff --git a/chapters/introduction.adoc b/chapters/introduction.adoc
index a580472..0a94ef3 100644
--- a/chapters/introduction.adoc
+++ b/chapters/introduction.adoc
@@ -321,6 +321,14 @@ Let `out_ref` be the result of the fp64_t reference implementation of `sin(x)`.
 Let `err_bnd = abs(out_ref) * exp2(-normal_frac<in_out_t>/2)` +
 Then `tosa_reference_check_fp_bnd<in_out_t>(out_imp, out_ref, err_bnd)` must be true
 
+| <<RESIZE>>
+| The result corresponds to a sequence of floating-point calculations. +
+The allowable error bound for the result of a resize is based on the maximum value of an element in the input tensor. +
+Let `out_imp` be the implementation output. +
+Let `out_ref` be the result of the fp64_t reference implementation. +
+Let `err_bnd = max(abs(input)) * 0.006`. +
+Then `tosa_reference_check_fp_bnd<out_t>(out_imp, out_ref, err_bnd)` must be true.
+
 |===
 
 ===== Operator sequence precision requirement
-- 
cgit v1.2.1

