From b7293aedaea197acf1e5f93a0b450e6989c498d8 Mon Sep 17 00:00:00 2001
From: Kevin Petit <kevin.petit@arm.com>
Date: Mon, 5 Dec 2022 12:07:40 +0000
Subject: SELECT: Replace use of cmp_t with bool_t

cmp_t is only used in the definition of SELECT and always defined to bool_t.

This removes a special case in generators.

Signed-off-by: Kevin Petit <kevin.petit@arm.com>
Change-Id: I9e7992bbfdf5c7fafdd55df90feb4dcbcdee2972
---
 chapters/ewise_ternary.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'chapters/ewise_ternary.adoc')

diff --git a/chapters/ewise_ternary.adoc b/chapters/ewise_ternary.adoc
index eb30a01..0b8097d 100644
--- a/chapters/ewise_ternary.adoc
+++ b/chapters/ewise_ternary.adoc
@@ -21,7 +21,7 @@ for_each(index in shape) {
     dim_t index1 = apply_broadcast(shape, shape1, index);
     dim_t index2 = apply_broadcast(shape, shape2, index);
     dim_t index3 = apply_broadcast(shape, shape3, index);
-    cmp_t value1 = tensor_read<cmp_t>(input1, shape1, index1);
+    bool_t value1 = tensor_read<bool_t>(input1, shape1, index1);
     in_out_t value2 = tensor_read<in_out_t>(input2, shape2, index2);
     in_out_t value3 = tensor_read<in_out_t>(input3, shape3, index3);
     in_out_t result;
-- 
cgit v1.2.1

