From cb6c6b33cc85d6c40d46b1ee78bcbd6a049017d5 Mon Sep 17 00:00:00 2001
From: Dominic Symes <dominic.symes@arm.com>
Date: Fri, 29 Apr 2022 16:15:56 +0100
Subject: Specify width of integer types

Clarify for types previously definded as int
the width assumed by the specification.

Signed-off-by: Dominic Symes <dominic.symes@arm.com>
Change-Id: Ied62d4803a4323a600d33cff09752a76ca48f18d
---
 chapters/control_flow.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'chapters/control_flow.adoc')

diff --git a/chapters/control_flow.adoc b/chapters/control_flow.adoc
index c9d4e15..e3c7fad 100644
--- a/chapters/control_flow.adoc
+++ b/chapters/control_flow.adoc
@@ -70,7 +70,7 @@ ERROR_IF(tosa_output_shape(cond_graph) != tosa_list_shape([bool_t]));
 
 // The iteration number 'i' is included to give unique names to variables
 // in each iteration of the loop and is not required by implementations
-int i=0;                 // iteration number
+int32_t i=0;             // iteration number
 list[i] = input_list;    // copy input data as list[0]
 tosa_execute_graph(cond_graph, list[i], [condition[i]]);   // initial condition
 while (condition[i]) {
-- 
cgit v1.2.1

