From 77d0f76b42c6353459d3271ccba9e41728d066cd Mon Sep 17 00:00:00 2001
From: Kevin Cheng <kevin.cheng@arm.com>
Date: Tue, 24 Nov 2020 10:26:32 -0800
Subject: Update reference model/serialization library to 0.21.0 with unit
 tests added/updated - update tosa.GATHER - update tosa.RESIZE - add
 tosa.SCATTER

Signed-off-by: Kevin Cheng <kevin.cheng@arm.com>
Change-Id: I1c3247b831a64e35a85c4044b24c6c29b8e18d25
---
 serialization/operator.def | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'serialization/operator.def')

diff --git a/serialization/operator.def b/serialization/operator.def
index 267976c..9a93b70 100644
--- a/serialization/operator.def
+++ b/serialization/operator.def
@@ -100,7 +100,8 @@ DEF_OPERATOR(tile,                    TILE,                     Tile,
 DEF_OPERATOR(transpose,               TRANSPOSE,                Transpose,              None,             None)
 
 /* gather/scatter */
-DEF_OPERATOR(gather,                  GATHER,                   Gather,                 Axis,             None)
+DEF_OPERATOR(gather,                  GATHER,                   Gather,                 None,             None)
+DEF_OPERATOR(scatter,                 SCATTER,                  Scatter,                None,             None)
 
 /* image */
 DEF_OPERATOR(resize,                  RESIZE,                   Resize,                 Resize,           None)
-- 
cgit v1.2.1

